
// Pebble Tech Solutions Static Entry
// This file is no longer needed for rendering the React application as we have moved to a high-performance 
// static architecture in index.html to better satisfy the SEO and professional conversion requirements.
console.log('Pebble Tech Solutions Static Page Loaded');
